Foo Fighters Reveal Josh Freese As New Drummer

Foo Fighters have revealed that Josh Freese is their new drummer, taking over for Taylor Hawkins, who passed away last year. The news was officially announced in a livestream event that took place on Sunday ahead of Foo Fighters’ extensive run of live dates that are planned for the rest of the year.